; Labps.def : Declares the module parameters.
;
; This is a part of the ActiveX Template Library.
; Copyright (C) 1996 Microsoft Corporation
; All rights reserved.
;
; This source code is only intended as a supplement to the
; ActiveX Template Library Reference and related
; electronic documentation provided with the library.
; See these sources for detailed information regarding the
; ActiveX Template Library product.

LIBRARY      LabPS

DESCRIPTION  'Proxy/Stub DLL'

EXPORTS
	DllGetClassObject       @1 PRIVATE
	DllCanUnloadNow         @2 PRIVATE
	GetProxyDllInfo         @3 PRIVATE
	DllRegisterServer       @4 PRIVATE
	DllUnregisterServer     @5 PRIVATE
