;===========================================================================;
;
;   THIS CODE AND INFORMATION IS PROVIDED "AS IS" WITHOUT WARRANTY OF
;   ANY KIND, EITHER EXPRESSED OR IMPLIED, INCLUDING BUT NOT LIMITED
;   TO THE IMPLIED WARRANTIES OF MERCHANTABILITY AND/OR FITNESS FOR
;   A PARTICULAR PURPOSE.
;
;   Copyright (C) 1993 - 1997 Microsoft Corporation. All Rights Reserved.
;
;   app16.def
;
;   Description:
;       This is the module definition file...
;
;===========================================================================;

NAME        MCIAPP      WINDOWAPI

DESCRIPTION 'Media Control Interface (MCI) Script Application (Win 16)'

EXETYPE     WINDOWS

PROTMODE

STUB        'WINSTUB.EXE'

CODE        MOVEABLE DISCARDABLE    LOADONCALL
DATA        MOVEABLE MULTIPLE       PRELOAD

SEGMENTS    _TEXT       MOVEABLE                PRELOAD
            INIT_TEXT   MOVEABLE DISCARDABLE    PRELOAD
            MCIAPP_TEXT MOVEABLE DISCARDABLE    PRELOAD


;- - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - -;
;   NOTE: some of the functions that are called in this application
;   require a LOT of stack space: most notably are the COMMDLG functions
;   (ie GetOpenFileName, etc). a stacksize of ~8k is probably good enough.
;- - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - - -;

HEAPSIZE    16384
STACKSIZE   8192

EXPORTS     AppWndProc
            AboutDlgProc
