
NAME         plgblt

DESCRIPTION  'Windows Sample'

EXETYPE      WINDOWS

STUB	     'WINSTUB.EXE'

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     1024
STACKSIZE    5120



EXPORTS
	MainWndProc   @1   ; name of window processing function
        DlgProc       @2
